%GNUPLOT: LaTeX picture with Postscript
\begin{picture}(0,0)%
\includegraphics{eichgerade}%
\end{picture}%
\begingroup
\setlength{\unitlength}{0.0200bp}%
\begin{picture}(18000,10800)(0,0)%
\put(2475,1650){\makebox(0,0)[r]{\strut{} 0.06}}%
\put(2475,2721){\makebox(0,0)[r]{\strut{} 0.08}}%
\put(2475,3793){\makebox(0,0)[r]{\strut{} 0.1}}%
\put(2475,4864){\makebox(0,0)[r]{\strut{} 0.12}}%
\put(2475,5936){\makebox(0,0)[r]{\strut{} 0.14}}%
\put(2475,7007){\makebox(0,0)[r]{\strut{} 0.16}}%
\put(2475,8079){\makebox(0,0)[r]{\strut{} 0.18}}%
\put(2475,9150){\makebox(0,0)[r]{\strut{} 0.2}}%
\put(2750,1100){\makebox(0,0){\strut{} 6}}%
\put(4811,1100){\makebox(0,0){\strut{} 8}}%
\put(6871,1100){\makebox(0,0){\strut{} 10}}%
\put(8932,1100){\makebox(0,0){\strut{} 12}}%
\put(10993,1100){\makebox(0,0){\strut{} 14}}%
\put(13054,1100){\makebox(0,0){\strut{} 16}}%
\put(15114,1100){\makebox(0,0){\strut{} 18}}%
\put(17175,1100){\makebox(0,0){\strut{} 20}}%
\put(550,5400){\rotatebox{90}{\makebox(0,0){\strut{}Extinktion}}}%
\put(9962,275){\makebox(0,0){\strut{}Konzentration [mg/100ml]}}%
\put(9962,9975){\makebox(0,0){\strut{}Photometrie}}%
\put(9900,8575){\makebox(0,0)[r]{\strut{}Messpunkte der Eichgerade}}%
\put(9900,8025){\makebox(0,0)[r]{\strut{}Eichgerade}}%
\put(9900,7475){\makebox(0,0)[r]{\strut{}Messpunkt}}%
\end{picture}%
\endgroup
\endinput
